From 081e05104a6921b513ccef2b3266b1465ef5e27f Mon Sep 17 00:00:00 2001
From: "Andreas K. Huettel" <dilfridge@gentoo.org>
Date: Sat, 21 Jul 2012 23:18:51 +0200
Subject: Define stability levels.

---
 names.tex | 8 +-------
 1 file changed, 1 insertion(+), 7 deletions(-)

(limited to 'names.tex')

diff --git a/names.tex b/names.tex
index fd9731c..decc8f4 100644
--- a/names.tex
+++ b/names.tex
@@ -40,13 +40,7 @@ hyphen. In addition, every repository name must also be a valid package name.
 \label{sec:keyword-names}
 A keyword name may contain any of the characters [\t{A-Za-z0-9\_-}]. It must not begin with a
 hyphen. In contexts where it makes sense to do so, a keyword name may be prefixed by
-a tilde or a hyphen. In \t{KEYWORDS}, \t{-*} is also acceptable as a keyword, to indicate that
-a package will only work on listed targets.
-
-A tilde prefixed keyword is, by convention, used to indicate a less stable package. It is generally
-assumed that any user accepting keyword \t{\textasciitilde{}foo} will also accept \t{foo}.
-
-The exact meaning of any keywords value is beyond the scope of this specification.
+a tilde or a hyphen. In \t{KEYWORDS}, \t{-*} is also acceptable as a keyword.
 
 \subsection{EAPI Names}
 \label{sec:eapi-names}
-- 
cgit v1.2.3-65-gdbad

